012345678

-1.00

-0.98

-0.96

-0.94

-0.92

-0.90

-0.88

-0.86

-0.84

-0.82

-0.80

-0.78

-0.76

-0.74

-0.72

-0.70

-0.68

-0.66

-0.64

-0.62

-0.60

-0.58

-0.56

-0.54

-0.52

-0.50

-0.48

-0.46

-0.44

-0.42

-0.40

-0.38

-0.36

-0.34

-0.32

-0.30

-0.28

-0.26

-0.24

-0.22

-0.20

-0.18

-0.16

-0.14

-0.12

-0.10

-0.08

-0.06

-0.04

-0.0200.02

0.04

0.06

0.08

0.10

0.12

0.14

0.16

0.18

0.20

0.22

0.24

0.26

0.28

0.30

0.32

0.34

0.36

0.38

0.40

0.42

0.44

0.46

0.48

0.50

0.52

0.54

0.56

0.58

0.60

0.62

0.64

0.66

0.68

0.70

0.72

0.74

0.76

0.78

0.80

0.82

0.84

0.86

0.88

0.90

0.92

0.94

0.96

0.98

1.00x105

012345678

Time-Offset/6 [s]

-100 -90 -80 -70 -60 -50 -40 -30 -20 -10 0 10 20 30 40 50 60 70 80 90 100 Offset [km]

Filter 3,5,24,36, gain proportional to offset

Davis Strait Line 1 OBS 08 Channel 4 W E