	Archive / Seg-Y Installation Process.  87.03.12

During Installation directories will be created, and files copied to your
system, with the following restrictions.

dBase III+ , Compaq TAPE V2.02 , BACKUP , and GLIMPSE, Must be Installed
on the DOS Path to implement ARCHIVE. The EDA Plan Database is Required to
INDEX or UPDATE Trace File Control Data.

1) ARCHIVE.CFG, ARCHIVE.BAT, and MAKESEGY.BAT will be placed in the root
   directory of the Boot Drive.

2) MSEGY.EXE and USEGY.EXE MUST be placed in a directory on the DOS Path.

3) The \ARCHIVE system subdirectory Can Be Placed on ANY drive with
   approximately one Megabyte of Free Space.

4) The \SAVESET, \MAKSEGY and \<EDA Project> working subdirectories MUST be on
   the same drive for the Archive system to work. SEG-Y output files may
   directed to any drive:\subdirectory as needed.

...
