14151617181920212223Freq. (Hz)

4096.00

2731.00

2048.00

1365.00

1024.00

682.70

512.00

341.30

256.00

128.00

64.00

32.00

16.00

8.00

4.00

2.00

1.00

0500meters t1l09n

10o-10o